--- config/cf/host.def.orig	Tue Dec  9 17:50:12 2003
+++ config/cf/host.def	Tue Dec  9 23:06:33 2003
@@ -5,7 +5,7 @@
 #define XFree86CustomVersion "DRI trunk"
 
 /* You need this now */
-#define MesaSrcDir /X11R6/SourceForge/Mesanew/Mesa-newtree
+#define MesaSrcDir $(TOP)/../Mesa-newtree
 
 
 /* Don't use any special flags by default, but leave this here commented out
@@ -24,6 +24,13 @@
 #endif
 */
 
+#define DefaultGcc2AxpOpt ${FBSDCFLAGS}
+#define DefaultGcc2PpcOpt ${FBSDCFLAGS}
+#define DefaultGcc2i386Opt ${FBSDCFLAGS}
+#define LibraryCDebugFlags ${FBSDCFLAGS}
+
+#define CcCmd ${FBSDCC}
+#define CplusplusCmd ${FBSDCXX}
 
 #define BuildXFree86ConfigTools YES
 
@@ -46,15 +53,17 @@
 
 #if defined(FreeBSDArchitecture) && defined(HasGcc3) && HasGcc3
 #define NoSystemWarn		-Wno-system-headers
+#define AliasingArg		-fno-strict-aliasing
 #else
 #define NoSystemWarn
+#define AliasingArg
 #endif
 
 #define GccWarningOptions -Wall -Wpointer-arith -Wstrict-prototypes \
                           -Wmissing-prototypes -Wmissing-declarations \
                           -Wredundant-decls -Wnested-externs -Wundef \
 			  NoSystemWarn
-#define DefaultCCOptions -ansi -pedantic GccWarningOptions -pipe -g
+#define DefaultCCOptions AliasingArg GccWarningOptions
 
 #define NormalLibGlx NO
 
