--- kdm/config.def.orig	Wed Jun 14 17:51:42 2006
+++ kdm/config.def	Wed Jun 14 17:51:57 2006
@@ -36,7 +36,7 @@
 # define HALT_CMD	"/usr/sbin/shutdown -h now"
 # define REBOOT_CMD	"/usr/sbin/shutdown -r now"
 #elif defined(BSD)
-# define HALT_CMD	"/sbin/shutdown -h now"
+# define HALT_CMD	"/sbin/shutdown -p now"
 # define REBOOT_CMD	"/sbin/shutdown -r now"
 #elif defined(__SVR4)
 # define HALT_CMD	"/usr/sbin/halt"
