# $FreeBSD$

# This is our first version; it depends on no other.
FBSD_1.0 {
};

# This is our private namespace.  Any global interfaces that are
# strictly for use only by other FreeBSD applications and libraries
# are listed here.  We use a separate namespace so we can write
# simple ABI-checking tools.
FBSDprivate_1.0 {
} FBSD_1.0;
